
CREATE TABLE `c_access` (
  `id` int(11) NOT NULL,
  `username` varchar(32) DEFAULT NULL,
  `uid` int(11) NOT NULL DEFAULT '0',
  `usertype` smallint(1) NOT NULL DEFAULT '2' COMMENT '用户类型(1adminer2user3member4fans)',
  `accesstoken` varchar(255) DEFAULT NULL COMMENT '登陆后生成的访问证',
  `updatetime` int(11) DEFAULT NULL COMMENT '记录更新时间',
  `expiretime` int(11) DEFAULT NULL COMMENT '失效时间',
  `ip` varchar(64) DEFAULT NULL,
  `domain` varchar(255) DEFAULT NULL COMMENT '来路域名',
  `hashchars` varchar(32) DEFAULT NULL COMMENT '随机混淆码',
  `data` text,
  `create_time` varchar(32) DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='登陆访问权限accesstoke';


ALTER TABLE `c_access`
  ADD PRIMARY KEY (`id`),
  ADD KEY `accesstoken` (`accesstoken`),
  ADD KEY `username` (`username`);


ALTER TABLE `c_access`
  MODIFY `id` int(11) NOT NULL AUTO_INCREMENT;
