---
title: MiniMax
description: MiniMaxモデルの設定
---

```json
{
  "model": "MiniMax-M2.7",
  "minimax_api_key": "YOUR_API_KEY"
}
```

| パラメータ | 説明 |
| --- | --- |
| `model` | `MiniMax-M2.7`、`MiniMax-M2.5`、`MiniMax-M2.1`、`MiniMax-M2.1-lightning`、`MiniMax-M2`などから選択可能 |
| `minimax_api_key` | [MiniMax Console](https://platform.minimaxi.com/user-center/basic-information/interface-key)で作成 |

OpenAI互換の設定もサポートしています:

```json
{
  "bot_type": "openai",
  "model": "MiniMax-M2.7",
  "open_ai_api_base": "https://api.minimaxi.com/v1",
  "open_ai_api_key": "YOUR_API_KEY"
}
```
