---
title: Web Console
description: Use CowAgent through the web console
---

The Web Console is CowAgent's default channel. It starts automatically after launch, allowing you to chat with the Agent through a browser and manage models, skills, memory, channels, and other configurations online.

## Configuration

```json
{
  "channel_type": "web",
  "web_port": 9899
}
```

| Parameter | Description | Default |
| --- | --- | --- |
| `channel_type` | Set to `web` | `web` |
| `web_port` | Web service listen port | `9899` |

## Access URL

After starting the project, visit:

- Local: `http://localhost:9899`
- Server: `http://<server-ip>:9899`

<Note>
  Ensure the server firewall and security group allow the corresponding port.
</Note>

## Features

### Chat Interface

Supports streaming output with real-time display of the Agent's reasoning process and tool calls, providing intuitive observation of the Agent's decision-making:

<img width="850" src="https://cdn.link-ai.tech/doc/20260227180120.png" />

### Model Management

Manage model configurations online without manually editing config files:

<img width="850" src="https://cdn.link-ai.tech/doc/20260227173811.png" />

### Skill Management

View and manage Agent skills (Skills) online:

<img width="850" src="https://cdn.link-ai.tech/doc/20260227173403.png" />

### Memory Management

View and manage Agent memory online:

<img width="850" src="https://cdn.link-ai.tech/doc/20260227173349.png" />

### Channel Management

Manage connected channels online with real-time connect/disconnect operations:

<img width="850" src="https://cdn.link-ai.tech/doc/20260227173331.png" />

### Scheduled Tasks

View and manage scheduled tasks online, including one-time tasks, fixed intervals, and Cron expressions:

<img width="850" src="https://cdn.link-ai.tech/doc/20260227173704.png" />

### Logs

View Agent runtime logs in real-time for monitoring and troubleshooting:

<img width="850" src="https://cdn.link-ai.tech/doc/20260227173514.png" />
